SET SQL_MODE="NO_AUTO_VALUE_ON_ZERO";

/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET @OLD_CHARACTER_SET_RESULTS=@@CHARACTER_SET_RESULTS */;
/*!40101 SET @OLD_COLLATION_CONNECTION=@@COLLATION_CONNECTION */;
/*!40101 SET NAMES utf8 */;

--
-- Structure de la table `char_look`
--

DROP TABLE IF EXISTS `char_look`;
CREATE TABLE IF NOT EXISTS `char_look` (
  `charid` int(10) unsigned NOT NULL,
  `face` tinyint(2) unsigned NOT NULL DEFAULT '0',
  `race` tinyint(2) unsigned NOT NULL DEFAULT '0',
  `size` tinyint(1) unsigned NOT NULL DEFAULT '0',
  `head` smallint(4) unsigned NOT NULL DEFAULT '0',
  `body` smallint(4) unsigned NOT NULL DEFAULT '8',
  `hands` smallint(4) unsigned NOT NULL DEFAULT '8',
  `legs` smallint(4) unsigned NOT NULL DEFAULT '8',
  `feet` smallint(4) unsigned NOT NULL DEFAULT '8',
  `main` smallint(4) unsigned NOT NULL DEFAULT '0',
  `sub` smallint(4) unsigned NOT NULL DEFAULT '0',
  `ranged` smallint(4) unsigned NOT NULL DEFAULT '0',
  PRIMARY KEY (`charid`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci AVG_ROW_LENGTH=24;
