SET SQL_MODE="NO_AUTO_VALUE_ON_ZERO";

/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET @OLD_CHARACTER_SET_RESULTS=@@CHARACTER_SET_RESULTS */;
/*!40101 SET @OLD_COLLATION_CONNECTION=@@COLLATION_CONNECTION */;
/*!40101 SET NAMES utf8 */;

--
-- Structure de la table `char_equip`
--

DROP TABLE IF EXISTS `char_equip`;
CREATE TABLE IF NOT EXISTS `char_equip` (
  `charid` int(10) unsigned NOT NULL,
  `slotid` tinyint(1) unsigned NOT NULL DEFAULT '0',
  `equipslotid` tinyint(1) unsigned NOT NULL DEFAULT '0',
  `containerid` tinyint(1) unsigned NOT NULL DEFAULT '0',
  PRIMARY KEY (`charid`,`equipslotid`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci AVG_ROW_LENGTH=41;
