SET FOREIGN_KEY_CHECKS=0;
-- ----------------------------
-- Table structure for char_recast
-- ----------------------------
DROP TABLE IF EXISTS `char_recast`;
CREATE TABLE `char_recast` (
  `charid` int(10) unsigned NOT NULL,
  `id` smallint(5) NOT NULL DEFAULT '0',
  `time` int(10) NOT NULL DEFAULT '0',
  `recast` smallint(5) NOT NULL DEFAULT '0',
  PRIMARY KEY (`charid`,`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci;

-- ----------------------------
-- Records
-- ----------------------------
