SET SQL_MODE="NO_AUTO_VALUE_ON_ZERO";

/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET @OLD_CHARACTER_SET_RESULTS=@@CHARACTER_SET_RESULTS */;
/*!40101 SET @OLD_COLLATION_CONNECTION=@@COLLATION_CONNECTION */;
/*!40101 SET NAMES utf8 */;

--
-- Structure de la table `linkshells`
--

DROP TABLE IF EXISTS `linkshells`;
CREATE TABLE IF NOT EXISTS `linkshells` (
  `linkshellid` int(10) unsigned NOT NULL AUTO_INCREMENT,
  `name` varchar(20) NOT NULL DEFAULT '',
  `color` smallint(5) unsigned NOT NULL DEFAULT '61440',
  `poster` varchar(15) NOT NULL DEFAULT '',
  `message` BLOB NULL,
  `messagetime` int(10) unsigned NOT NULL DEFAULT '0',
  `postrights` tinyint(3) unsigned NOT NULL DEFAULT '0',
  `broken` tinyint(1) unsigned NOT NULL DEFAULT '0',
  PRIMARY KEY (`linkshellid`)
) ENGINE=InnoDB  DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci AUTO_INCREMENT=1 ;
